X-Git-Url: https://git.ladys.computer/OldStandard/blobdiff_plain/6b3ea2923b50825170ffca3ebfea99a2fab97bdd..b527844845877a20874e9cdc9c4720bcb8d44c77:/fonttable.tex

diff --git a/fonttable.tex b/fonttable.tex
deleted file mode 100644
index f1b2814..0000000
--- a/fonttable.tex
+++ /dev/null
@@ -1,30 +0,0 @@
-\documentclass[12pt]{article}
-\usepackage{fontspec}
-
-\usepackage{array}
-\usepackage{longtable}
-\usepackage{latexcolors}
-
-\usepackage{luacode}
-\luadirect{require("fonttable.lua")}
-
-\setmainfont{Old Standard}
-
-\title{\textsc{Old Standard}}
-\author{Font Table}
-\date{}
-
-\begin{document}
-\maketitle
-
-\color{cinnamon}
-
-\begin{longtable}{>{\color{gray}\ttfamily\footnotesize}r|
-                  *{10}{>{\color{black}}p{1.5em}|}}
-\cline{2-11}
-\endhead
-
-\luadirect{ft.print_glyphs(10,65463)} \\ \cline{2-11}
-\end{longtable}
-
-\end{document}
\ No newline at end of file
